Uchwała Nr XXV/123/16
Rady Gminy Głowno

z dnia 14 listopada 2016 r.

w sprawie ustalenia wysokości ekwiwalentu pieniężnego dla członków Ochotniczych Straży Pożarnych Gminy Głowno.

Na podstawie art.18 ust.2 pkt 15 ustawy z dnia 8 marca 1990 r. o samorządzie gminnym (Dz.U.2016.446 j.t.) w związku z art. 28 ust.1 i 2 oraz art.29 pkt 2 ustawy z dnia 24 sierpnia 1991 roku o ochronie przeciwpożarowej (Dz.U.2016.191 j.t.)  uchwala się, co następuje:

§ 1. Członek Ochotniczej Straży Pożarnej, który uczestniczył w działaniu ratowniczym otrzymuje ekwiwalent pieniężny w wysokości 15 zł za godzinę udziału w działaniu ratowniczym oraz ekwiwalent pieniężny w wysokości 11 zł za godzinę udziału w szkoleniu pożarniczym organizowanym przez Państwową Straż Pożarną lub Gminę Głowno.

§ 2. Ekwiwalent, o którym mowa w § 1 jest wypłacany z budżetu gminy.

§ 3. Ekwiwalent, o którym mowa w § 1 nie przysługuje członkowi OSP, który za czas nieobecności w pracy uzyskał wynagrodzenie na podstawie odrębnych przepisów.

§ 4. Wykonanie uchwały powierza się Wójtowi Gminy Głowno.

§ 5. Traci moc uchwała nr XXIX/152/08 Rady Gminy Głowno z dnia 23 grudnia 2008 roku w sprawie ustalenia wysokości ekwiwalentu pieniężnego dla członków Ochotniczych Straży Pożarnych.

§ 6. Uchwała wchodzi w życie po upływie 14 dni od dnia ogłoszenia w Dzienniku Urzędowym Województwa Łódzkiego z mocą obowiązującą od 1 stycznia 2017 r.

Przewodniczący Rady Gminy Głowno

Łukasz Łukasik